-- Update user role to super_admin
-- 用法: 替换 <USERNAME> 或 <ACCOUNT_ID> 为实际值后执行
--
-- UPDATE accounts SET role = 'super_admin' WHERE username = '<USERNAME>';
-- UPDATE accounts SET role = 'super_admin' WHERE id = '<ACCOUNT_ID>';
